)^2

(GeV/c γγM 0.1 0.15 0.2

2 Events/2 MeV/c

0

2

4

6

8

10 310 × PCM <0.8 GeV/c T : 0.6<p 0π

)^2

(GeV/c γγM 0.4 0.5 0.6 0.7

2 Events/8 MeV/c

0

2

4

6 310 × <1.8 GeV/c T : 1.4<p η